en	[[!meta title="Tor Browser not safe without manual action"]]

en	Tor Browser in Tails 3.13.1 is not safe to use without taking the manual steps listed below each time you start Tails!

en	Starting from Friday May 3, a problem in *Firefox* and *Tor Browser* disabled all add-ons, especially *NoScript* which is used to:

en	Strengthen *Tor Browser* against some JavaScript attacks that can lead to compromised accounts and credentials on websites.

en	Enable or disable JavaScript on some websites using the *NoScript* interface, if you use it.

en	If *NoScript* is activated, the *NoScript* icon appears in the top-right corner and *Tor Browser* is safe:

en	[[!img news/version_3.13.2/with-noscript.png alt="" link="no"]]

en	If *NoScript* is deactivated, the *NoScript* icon is absent from the top-right corner and *Tor Browser* is unsafe:

en	[[!img news/version_3.13.2/without-noscript.png alt="" link="no"]]

en	Activate *NoScript* manually

en	To secure *Tor Browser* in Tails 3.13.1 or earlier, you must activate *NoScript* every time you start Tails:

en	Open the address about:config in *Tor Browser*.

en	[[!img news/version_3.13.2/about-config.png link="no"]]

en	Click the **I accept the risk!** button.

en	At the top of the page, search for xpinstall.signatures.required.

en	Double-click on the **xpinstall.signatures.required** line in the results to set its value to **false**.

en	Verify that *NoScript* is activated again.

en	[[!img news/version_3.13.2/xpinstall-false.png link="no"]]